Copyright: Copyright® 1994 MIRO Technology.


CONTENTS
Overview.

Thank you for purchasing North America Area Code 2.0.  North America Area Code 2.0.makes it incredibly easy to find an area code, a city, a state/province while showing you the time difference between your city and another city anywhere in North America.  You'll never have to take out that telephone book again!!!

Introduction.

What's New in Version 2.0.

Getting Started.

System Requirements.

Other Modules for Version 2.0.

Tips & Tricks.

Questions & Answers.

Product Support.

Registration.

Registration By Mail.

Registration Through Compuserve.

Registration By Phone (Credit Card Orders).


WHATS NEW IN VERSION 2.0
•	Complete on-line help.

•	Program can be installed on any drive/directory.

•	Data Maintenance (available under program setup).

1	Add new area codes, cities, states/provinces, etc.

2	Delete any existing record.

3	Find specific area codes.

4	Sort by area code, city, state/province, time zone.

5	Ability to preview and/or print entire database or a specific listing.

6	Ability to export to various formats or E-mail.

•	Full colored maps showing North America, Canada, U.S.A. and individual states and provinces.

•	Tree-like listing showing area codes on the main screen.


GETTING STARTED
How North America Area Code 2.0 works.

Select the top area code on the main screen.  Once, this has been done, the program automatically brings up the appropriate state/province and all corresponding cities. Notice that the local area code, local state/province, local city, and local time zone should be set up to represent your local area.

Files Installed in the directory.

In your directory.

•	Ac2.exe, Ac2.hlp, Local.dat, Maps.ldb, Maps.mdb, Areacode.ldb, Areacode.mdb, States.ldb, and States.mdb.

Windows\System

•	Crpe.dll, Crystal.vbx, Cspictur.vbx, Curtim.vbx, Msaes110.dll, Msajt110.dll, Msoutlin.vbx, Pdbbnd.dll, Qpro200.dll, Threed.vbx, Truegrid.vbx, Vbctl3d.vbx, Vbdb300.dll, Vbrun300.dll, Vsvbx.vbx, Vsvbx.lic, Uxddisk.dll, Uxdmapi.dll, Uxfcr.dll, Uxfdif.dll, Uxfdoc.dll, Uxfrec.dll, Uxfrft.dll, Uxfsepv.dll, Uxftext.dll, Uxfwks.dll and Uxfxls.dll


SYSTEM REQUIREMENTS
System Requirements.

•	Personal Computer using an 80286 or higher microprocessor (80486 is recommended).

•	2 MB RAM (4 MB is recommended).

•	EGA, VGA, Super VGA, XGA, 8514/a or compatible video graphics card.

•	Mouse.

Software Requirements.

•	MS DOS operating system version 3.1 or later.

•	MS Windows version 3.1 or later.


OTHER MODULE
Coming Soon.

•	Africa.

•	Europe.

•	South America.

•	Australia.

•	Asia.

•	Middle East.

•	India.

•	Mexico.


TIPS AND TRICKS
•	Double click on Logo to display credit.

•	On the Data Maintenance screen, you can select single or multiple records by using the mouse button. Ensure that the mouse pointer is on the left horizontal border, when a check mark appears, click the mouse button to highlight records.  You may then delete the records.


QUESTION AND ANSWERS
Q. How do I set up my local area code?

•	On the main screen, click on setup. Then click on the top radio button.  Now select your local area code, your state/province, then your city. Finally, click on the SAVE button. The time zone will automatically default to the corresponding area code.

Q. How do I add, delete, modify, print, sort, or find one or more records?

•	On the main screen, click on setup. Then click on the bottom radio button. A second screen appears titled Data Maintenance.  You can now choose your desired task.

When pressing the print button, the report will be previewed/shown on the screen.  To print the report, you must now click on the printer icon.

Q. How do I change my default printer?

•	To change the default printer, select control panel in MS Windows, then select Printers.  Next highlight desired installed printers and click on Set As Default Printer button.

Q. How can I select another state/province map?

•	Move the mouse pointer to the map on the left hand side (defaults to North America), and click the right mouse button.  A pop-up menu comes up. Now move the mouse pointer to Canada or U.S. and press the right mouse button.  Another pop-up menu now appears showing appropriate states/provinces depending on the previous selection. Again move the mouse pointer to a desired state/province and click on the right mouse button.  The selected state/province map should now appear in the top right corner with a listing of area codes and cities on the bottom right hand side.


PRODUCT SUPPORT
•	Free support for 90 days.

•	Bugs & minor fixes are free.

•	Discount on new versions / releases.

•	For support, please call Razhick Ouma at (416) 398-7693 or Michael Clement at (905) 764-6145 between 6:00 p.m and 10:00 p.m. Eastern Standard Time.


REGISTRATION BY MAIL
•	To get a hard copy of the following form select file menu, Print.

To register By Mail (CHEQUE OR MONEY ORDER ONLY)

•	In USA and CANADA

Please register my copy of North America Area Code 2.0. I am sending a cheque or money order for the amount of $12.00 + $3.00 Shipping and Handling. (CANADIAN FUNDS).)

Name :________________________________________________________

Company:______________________________________________________

Address 1:_____________________________________________________

Address 2:_____________________________________________________

City :__________________________________________________________

State :_________________________________________________________

Zip :___________________________________________________________

Country :_______________________________________________________

Telephone :_____________________________________________________

Fax :__________________________________________________________

Where did you here about this product : _______________________________________________________________

Multi-User Registration.

Single User ..................................................... $   12.00 CND

10 to 20 Users ................................................. $ 150.00 CND

Amount inclosed .................................................................................. $

Please specify disk size            3.5 __________      5.25 __________

Send completed form with payment to.

MCRO Technology.

83 Tavistock Road,

Downsview, Ontario,

M3M 2N8.

CANADA.


REGISTRATION THROUGH COMPUSERVE
•	This feature is currently not available.


REGISTRATION BY PHONE
For registration, please call Razhick Ouma at (416) 398-7693 or Michael Clement at (905) 764-6145 between 6:00 p.m and 10:00 p.m. Eastern Standard Time.


WHAT DO YOU GET